From 205ab8a223ddf6591a3e8bfc9108506502977c11 Mon Sep 17 00:00:00 2001
From: soryu <soryu@soryu.co>
Date: Fri, 16 Jan 2026 12:23:49 +0000
Subject: Fixup: use default api.makima.jp URL and fix default branch detection

Also add checkpointing/history
---
 makima/frontend/src/components/NavStrip.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'makima/frontend/src/components/NavStrip.tsx')

diff --git a/makima/frontend/src/components/NavStrip.tsx b/makima/frontend/src/components/NavStrip.tsx
index 48abe09..7e12c75 100644
--- a/makima/frontend/src/components/NavStrip.tsx
+++ b/makima/frontend/src/components/NavStrip.tsx
@@ -14,6 +14,7 @@ const NAV_LINKS: NavLink[] = [
   { label: "Contracts", href: "/contracts", requiresAuth: true },
   { label: "Board", href: "/workflow", requiresAuth: true },
   { label: "Mesh", href: "/mesh", requiresAuth: true },
+  { label: "History", href: "/history", requiresAuth: true },
 ];
 
 export function NavStrip() {
-- 
cgit v1.2.3

