From 1a995e32c8468d35e88b4e9618458f0cb29ae3c5 Mon Sep 17 00:00:00 2001
From: soryu <soryu@soryu.co>
Date: Wed, 3 Jun 2026 19:45:41 +0100
Subject: feat: soryu - soryu.co: Remove Login button from LandingPage

---
 frontend/src/App.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'frontend/src/App.tsx')

diff --git a/frontend/src/App.tsx b/frontend/src/App.tsx
index 0a0e008..9a84b3b 100644
--- a/frontend/src/App.tsx
+++ b/frontend/src/App.tsx
@@ -2,7 +2,7 @@ import React from 'react'
 import { useStore } from '@nanostores/react'
 import { LandingPage } from './components/LandingPage'
 import { VNInterface } from './components/VNInterface'
-import { isLoggedInStore, login, logout } from './stores'
+import { isLoggedInStore, logout } from './stores'
 
 export default function App() {
   const isLoggedIn = useStore(isLoggedInStore)
@@ -12,7 +12,7 @@ export default function App() {
       {isLoggedIn ? (
         <VNInterface onLogout={logout} />
       ) : (
-        <LandingPage onLogin={login} />
+        <LandingPage />
       )}
     </>
   )
-- 
cgit v1.2.3

